= Pelican

== Summary

**This project is WIP and is not meant for production use**

Pelican is a simple Kanban board for your terminal.

== Storage

Data is stored in a https://github.com/etcd-io/bbolt[BoltDB] database.
For Linux the default the database file is located at $XDG\_DATA\_HOME/canal/canal.db
If $XDG\_DATA\_HOME is not set then the default location is $HOME/.local/share/canal/canal.db by default.
For all other operating systems the default location is $HOME/.canal/canal.db.

== Keybindings

TBC

== Inspiration

https://github.com/witchard/toukan[The toukan project]
